nv

0.02

0.04

0.06

= 2.76 TeV NNs Pb-Pb 5-10% ALICE AMPT {2} 2v {4} 2v {2} 3v {2} 4v

η 4- 3- 2- 1- 0 1 2 3 4 5

nv

0 0.02

0.04

0.06

0.08

40-50%